---
summary: "Deploy OpenClaw on Render with Infrastructure-as-Code"
read_when:
  - Deploying OpenClaw to Render
  - You want a declarative cloud deploy with Render Blueprints
title: "Render"
---

Deploy OpenClaw on Render using Infrastructure as Code. The included `render.yaml` Blueprint defines your entire stack declaratively, service, disk, environment variables, so you can deploy with a single click and version your infrastructure alongside your code.

## Prerequisites

- A [Render account](https://render.com) (free tier available)
- An API key from your preferred [model provider](/providers)

## Deploy with a Render Blueprint

[Deploy to Render](https://render.com/deploy?repo=https://github.com/openclaw/openclaw)

Clicking this link will:

1. Create a new Render service from the `render.yaml` Blueprint at the root of this repo.
2. Build the Docker image and deploy

Once deployed, your service URL follows the pattern `https://<service-name>.onrender.com`.

## Understanding the Blueprint

Render Blueprints are YAML files that define your infrastructure. The `render.yaml` in this
repository configures everything needed to run OpenClaw:

```yaml
services:
  - type: web
    name: openclaw
    runtime: docker
    plan: starter
    healthCheckPath: /health
    envVars:
      - key: OPENCLAW_GATEWAY_PORT
        value: "8080"
      - key: OPENCLAW_STATE_DIR
        value: /data/.openclaw
      - key: OPENCLAW_WORKSPACE_DIR
        value: /data/workspace
      - key: OPENCLAW_GATEWAY_TOKEN
        generateValue: true # auto-generates a secure token
    disk:
      name: openclaw-data
      mountPath: /data
      sizeGB: 1
```

Key Blueprint features used:

| Feature               | Purpose                                                    |
| --------------------- | ---------------------------------------------------------- |
| `runtime: docker`     | Builds from the repo's Dockerfile                          |
| `healthCheckPath`     | Render monitors `/health` and restarts unhealthy instances |
| `generateValue: true` | Auto-generates a cryptographically secure value            |
| `disk`                | Persistent storage that survives redeploys                 |

## Choosing a plan

| Plan      | Spin-down         | Disk          | Best for                      |
| --------- | ----------------- | ------------- | ----------------------------- |
| Free      | After 15 min idle | Not available | Testing, demos                |
| Starter   | Never             | 1GB+          | Personal use, small teams     |
| Standard+ | Never             | 1GB+          | Production, multiple channels |

The Blueprint defaults to `starter`. To use free tier, change `plan: free` in
your fork's `render.yaml` (but note: no persistent disk means OpenClaw state
resets on each deploy).

## After deployment

### Access the Control UI

The web dashboard is available at `https://<your-service>.onrender.com/`.

Connect using the configured shared secret. This deploy template auto-generates
`OPENCLAW_GATEWAY_TOKEN` (find it in **Dashboard → your service →
Environment**); if you replace it with password auth, use that password
instead.

## Render Dashboard features

### Logs

View real-time logs in **Dashboard → your service → Logs**. Filter by:

- Build logs (Docker image creation)
- Deploy logs (service startup)
- Runtime logs (application output)

### Shell access

For debugging, open a shell session via **Dashboard → your service → Shell**. The persistent disk is mounted at `/data`.

### Environment variables

Modify variables in **Dashboard → your service → Environment**. Changes trigger an automatic redeploy.

### Auto-deploy

If you use the original OpenClaw repository, Render will not auto-deploy your OpenClaw. To update it, run a manual Blueprint sync from the dashboard.

## Custom domain

1. Go to **Dashboard → your service → Settings → Custom Domains**
2. Add your domain
3. Configure DNS as instructed (CNAME to `*.onrender.com`)
4. Render provisions a TLS certificate automatically

## Scaling

Render supports horizontal and vertical scaling:

- **Vertical**: Change the plan to get more CPU/RAM
- **Horizontal**: Increase instance count (Standard plan and above)

For OpenClaw, vertical scaling is usually sufficient. Horizontal scaling requires sticky sessions or external state management.

## Backups and migration

Export your state, config, auth profiles, and workspace at any time using the
shell access in the Render Dashboard:

```bash
openclaw backup create
```

This creates a portable backup archive with OpenClaw state plus any configured
workspace. See [Backup](/cli/backup) for details.

## Troubleshooting

### Service will not start

Check the deploy logs in the Render Dashboard. Common issues:

- Missing `OPENCLAW_GATEWAY_TOKEN` — verify it is set in **Dashboard → Environment**
- Port mismatch — ensure `OPENCLAW_GATEWAY_PORT=8080` is set so the gateway binds to the port Render expects

### Slow cold starts (free tier)

Free tier services spin down after 15 minutes of inactivity. The first request after spin-down takes a few seconds while the container starts. Upgrade to Starter plan for always-on.

### Data loss after redeploy

This happens on free tier (no persistent disk). Upgrade to a paid plan, or
regularly export a full backup via `openclaw backup create` in the Render shell.

### Health check failures

Render expects a 200 response from `/health` within 30 seconds. If builds succeed but deploys fail, the service may be taking too long to start. Check:

- Build logs for errors
- Whether the container runs locally with `docker build && docker run`

## Next steps

- Set up messaging channels: [Channels](/channels)
- Configure the Gateway: [Gateway configuration](/gateway/configuration)
- Keep OpenClaw up to date: [Updating](/install/updating)
